From 898271b33d74761310a9a92a67c5929ce3264297 Mon Sep 17 00:00:00 2001
From: TrainDoctor <traindoctor@protonmail.com>
Date: Sun, 6 Nov 2022 15:37:02 -0800
Subject: Revert "Disable store selection until PRs actually deploy to testing"

This reverts commit d389b403b521c48920d872c6ddd133b63ada2528.
---
 frontend/src/components/settings/pages/general/index.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'frontend/src/components/settings/pages/general/index.tsx')

diff --git a/frontend/src/components/settings/pages/general/index.tsx b/frontend/src/components/settings/pages/general/index.tsx
index 0ebfee12..d661b779 100644
--- a/frontend/src/components/settings/pages/general/index.tsx
+++ b/frontend/src/components/settings/pages/general/index.tsx
@@ -5,7 +5,7 @@ import { FaShapes, FaTools } from 'react-icons/fa';
 import { installFromURL } from '../../../../store';
 import BranchSelect from './BranchSelect';
 import RemoteDebuggingSettings from './RemoteDebugging';
-// import StoreSelect from './StoreSelect';
+import StoreSelect from './StoreSelect';
 import UpdaterSettings from './Updater';
 
 export default function GeneralSettings({
@@ -21,7 +21,7 @@ export default function GeneralSettings({
     <div>
       <UpdaterSettings />
       <BranchSelect />
-      {/* <StoreSelect /> */}
+      <StoreSelect />
       <RemoteDebuggingSettings />
       <Field
         label="Developer mode"
-- 
cgit v1.2.3

